SET FOREIGN_KEY_CHECKS=0;

INSERT INTO `pearProject`.`pear_system_config`(`name`, `value`) VALUES ('single_mode', '0');
INSERT INTO `pearProject`.`pear_system_config`(`name`, `value`) VALUES ('single_org_code', '');

SET FOREIGN_KEY_CHECKS=1;
