SET FOREIGN_KEY_CHECKS=0;

INSERT INTO `pearProject`.`pear_system_config`(`id`, `name`, `value`) VALUES (44, 'single_mode', '0');
INSERT INTO `pearProject`.`pear_system_config`(`id`, `name`, `value`) VALUES (45, 'single_org_code', '');

SET FOREIGN_KEY_CHECKS=1;
